CREATE OR REPLACE TABLE CISTOOLS.FUNCTION_PARAMS FOR SYSTEM NAME FUNCT00001 ( 
	SPECIFIC_SCHEMA FOR COLUMN SPECSCHEMA VARCHAR(128) ALLOCATE(10) CCSID 37	NOT NULL , 
	SPECIFIC_NAME FOR COLUMN SPECNAME   VARCHAR(128) ALLOCATE(18) CCSID 37	NOT NULL , 
	ORDINAL_POSITION FOR COLUMN PARMNO     INTEGER NOT NULL , 
	PARAMETER_MODE FOR COLUMN PARMMODE   VARCHAR(5) ALLOCATE(5) CCSID 37 NOT NULL	, 
	PARAMETER_NAME FOR COLUMN PARMNAME   VARCHAR(128) ALLOCATE(18) CCSID 37	DEFAULT NULL , 
	DATA_TYPE VARCHAR(128) ALLOCATE(18) CCSID 37 NOT NULL , 
	NUMERIC_SCALE FOR COLUMN SCALE      INTEGER DEFAULT NULL , 
	NUMERIC_PRECISION FOR COLUMN PRECISION  INTEGER DEFAULT NULL , 
	"CCSID" INTEGER DEFAULT NULL , 
	CHARACTER_MAXIMUM_LENGTH FOR COLUMN CHARLEN    INTEGER DEFAULT NULL , 
	CHARACTER_OCTET_LENGTH FOR COLUMN CHARBYTE   INTEGER DEFAULT NULL , 
	NUMERIC_PRECISION_RADIX FOR COLUMN RADIX      INTEGER DEFAULT NULL , 
	DATETIME_PRECISION FOR COLUMN DATPRC     INTEGER DEFAULT NULL , 
	IS_NULLABLE FOR COLUMN "NULLS" VARCHAR(3) ALLOCATE(3) CCSID 37 NOT NULL , 
	LONG_COMMENT FOR COLUMN REMARKS    VARGRAPHIC(2000) CCSID 1200 DEFAULT NULL ,	
	ROW_TYPE FOR COLUMN ROWTYPE    CHAR(1) CCSID 37 DEFAULT NULL , 
	DATA_TYPE_SCHEMA FOR COLUMN TYPESCHEMA VARCHAR(128) ALLOCATE(10) CCSID 37	DEFAULT NULL , 
	DATA_TYPE_NAME FOR COLUMN TYPENAME   VARCHAR(128) ALLOCATE(18) CCSID 37	DEFAULT NULL , 
	AS_LOCATOR FOR COLUMN ASLOCATOR  VARCHAR(3) ALLOCATE(3) CCSID 37 NOT NULL , 
	IASP_NUMBER FOR COLUMN IASPNUMBER SMALLINT NOT NULL , 
	NORMALIZE_DATA FOR COLUMN NORMALIZE  VARCHAR(3) ALLOCATE(3) CCSID 37 DEFAULT	NULL , 
	"DEFAULT" DBCLOB(65536) CCSID 1200 DEFAULT NULL )   
	  
	RCDFMT FUNCT00001 ; 

GRANT ALTER , DELETE , INDEX , INSERT , REFERENCES , SELECT , UPDATE   
ON CISTOOLS.FUNCTION_PARAMS TO AMAPICS WITH GRANT OPTION ; 

GRANT DELETE , INSERT , SELECT , UPDATE   
ON CISTOOLS.FUNCTION_PARAMS TO PUBLIC ; 

